<template>
  <div
      id="bad-gas-info"
      :style="{ backgroundImage: 'url(' + getImageUrl(bgImage) + ')' }">
    <div class="title">有害气体</div>
    <div v-if="badGasList==null||badGasList.length===0" class="showNull">
      <div class="loading" v-if="loading===0"></div>
      {{loading===0?'加载中...':'暂无数据~'}}
    </div>
    <div v-else class="info-list">
      <gas-info-item
          v-for="item in badGasList"
          :key="item.equipmentId"
          :gasInfo="item"
          @click="handleOpenChart"
      />
    </div>
    <div class="digital-tunnel">
      <el-dialog
          :close-on-click-modal="false"
          v-model="isBadGasVisited"
          title="有害气体监控数据"
          width="2175px"
          :modal="false"
      >
        <div class="left-top-icon"></div>
        <div class="right-top-icon"></div>
        <div class="loading-block" v-if="showLoading">
          <div class="loading" ></div>
          <span>加载中...</span>
        </div>
        <div class="chat-dialog" v-else>
          <div id="containerBad"></div>
          <div style="width: 1px"></div>
        </div>
        <div class="time-select">
          <time-range-btn
              :buttonList="timeList"
              v-model="selectTimeButton"
              @select="timeSelect"
          />
        </div>
        <div class="left-bottom-icon"></div>
        <div class="right-bottom-icon"></div>
      </el-dialog>
    </div>
  </div>
</template>

<script setup>
import GasInfoItem from "./childComps/GasInfoItem.vue";
import * as echarts from "echarts";
import TimeRangeBtn from "@/components/timeRangeBtn/index.vue";
import {getBadGasEchartsInfo} from "@/api/largeScreen";

const props = defineProps({
  list: Array,
  badGasData: Array,
  tunnelId: Number,
  loading: Number,
});
const timeList = ref(["年", "月", "日"]);
const selectTimeButton = ref(2);
const isBadGasVisited = ref(false);
const showLoading = ref(false)
const badGasList = ref([]);
let myEcharts = reactive({});
const bgImage = computed(() => (isBadGasVisited.value ? "sp_active.png" : "bg.png"));
watch(
    () => props.list,
    (now) => {
      badGasList.value?.forEach((item) => {
        now.forEach((newItem) => {
          if (item.equipmentId === newItem.equipmentId) {
            item.value = newItem.value;
          }
        });
      });
    },
    {deep: true}
);

watch(
    () => props.badGasData,
    (now) => {
      if (now.sensorList === null) {
        badGasList.value = []
      } else {
        getBadGasInfo(now.sensorList);
      }
    },
    {deep: true}
);

watch(
    () => props.tunnelId,
    (now) => {
      props.tunnelId = now
    },
    {deep: true}
);
const timeSelect = (index) => {
  console.log("选择时间", index);
  if (index === 0) {
    console.log("--年");
  } else if (index === 1) {
    console.log("--月");
  } else if (index === 2) {
    console.log("--日");
  }
};
const getBadGasInfo = (now) => {
  if (now === null) return;
  let windPressureObj = {};
  let windPressureArr = [];
  now?.map((item) => {
    if (
        item.equipmentType === "carbonDioxide" ||
        item.equipmentType === "carbonMonoxide" ||
        item.equipmentType === "hydrogenSulfide" ||
        item.equipmentType === "sulfurDioxide" ||
        item.equipmentType === "sulfurMonoxide" ||
        item.equipmentType === "nitrogenDioxide"
    ) {
      windPressureObj = changeData(item);
      windPressureArr.push(windPressureObj);
    }
  });
  badGasList.value = windPressureArr;
};
const changeData = (item) => {
  return {
    equipmentId: item.equipmentId,
    name: item.equipmentName.slice(0, item.equipmentName.length - 2),
    max: 120,
    value: item.value,
    point: item.valueThreshold,
    unit: item.unit,
  };
};
const getBadGasChartInfo = () => {
  isBadGasVisited.value = true
  showLoading.value=true
  let id = props.tunnelId
  getBadGasEchartsInfo(id).then(res => {
    if (res?.code === 1000) {
      showLoading.value=false
      nextTick(() => {
        initChart(res.data.dates, res.data)
      })
    }
  })
}
const handleOpenChart = () => {
  getBadGasChartInfo()
};
const getImageUrl = (name) => {
  return new URL(`../../../assets/images/badGasInfo/${name}`, import.meta.url)
      .href;
};
/**
 * 初始化echarts实例方法
 */
const initChart = (type, values) => {
  //3.初始化container容器
  myEcharts = echarts.init(document.getElementById("containerBad"));
  //5.传入数据
  let option = {
    //图例
    legend: {
      left: 0,
      textStyle: {
        color: '#60DDDE',
        fontSize: 40
      },
      itemWidth: 30,
      itemHeight: 30,
      icon: "circle",
    },
    //离容器四侧的距离
    grid: {
      left: 0, // 左边距
      right: 20, // 右边距
      top: 80, // 顶边距
      bottom: 0, // 底边距
      containLabel: true,
    },
    //提示框组件
    tooltip: {
      show: true,
      trigger: "axis",
      backgroundColor: "rgba(20,36,51,0.7)", // 设置背景颜色为透明
      borderColor: "#6087BA", // 设置边框颜色为透明
      padding: 0, // 设置内边距为0
      borderWidth: 2,
      textStyle: {
        fontSize: 40,
      },
      formatter: (params) => {
        let res = ` <div style="font-size: 52px;font-family: PingFang SC-Regular, PingFang SC;font-weight: 400;color: #EFEEEE;margin-bottom: -30px;margin-left: 20px">${params[0].name}</div>` + '<br/>'
        for (let i = 0; i < params.length; i++) {
          res += `
              <div style="font-size: 52px;line-height: 48px;font-family: Bebas Neue-Regular, Bebas Neue;font-weight: 400;margin:0 20px 30px 20px;"><span style="color: #FFFFFF">${params[i].seriesName}: </span><span style="background: linear-gradient(180deg, #F5B85F 0%, #FFFFFF 100%);background-clip: text;-webkit-background-clip: text;-webkit-text-fill-color: transparent;">${params[i].value}</span></div>
             `;
        }
        return res

        // return content;
      },
    },
    toolbox: {
      show: false,
      right: 10,
      feature: {
        dataZoom: {
          yAxisIndex: 'none'
        }
      }
    },
    dataZoom: [{
      type: 'inside'
    }],
    //X轴
    xAxis: {
      type: "category",
      // data: [
      //   "00:00",
      //   "01:00",
      //   "02:00",
      //   "03:00",
      //   "04:00",
      //   "05:00",
      //   "06:00",
      //   "07:00",
      //   "08:00",
      //   "09:00",
      //   "10:00",
      //   "11:00",
      //   "12:00",
      //   "13:00",
      //   "14:00",
      //   "15:00",
      //   "16:00",
      //   "17:00",
      //   "18:00",
      //   "19:00",
      //   "20:00",
      //   "21:00",
      //   "22:00",
      //   "23:00",
      //   "24:00",
      // ],
      data: type,
      axisLabel: {
        textStyle: {
          fontSize: 45,
          color: "#D6F1FA",
        },
      },
    },
    //Y轴
    yAxis: {
      type: "value",
      axisLabel: {
        textStyle: {
          fontSize: 45,
          color: "#D6F1FA",
        },
      },
    },
    //配置项
    series: [
      {
        name: "二氧化碳",
        // data: [
        //   56, 12, 89, 34, 71, 43, 67, 20, 98, 72, 19, 61, 3, 85, 47, 92, 17, 76,
        //   69, 25, 31, 49, 81, 63,
        // ],
        data: values.carbonDioxideValues,
        type: "line",
        smooth: true,
        symbolSize: 24,
        lineStyle: {
          width: 5,
        },
      },
      {
        name: "一氧化碳",
        // data: [
        //   96, 38, 75, 10, 62, 81, 41, 27, 69, 16, 33, 57, 73, 87, 22, 46, 11,
        //   79, 51, 29, 60, 48, 83, 15,
        // ],
        data: values.carbonMonoxideValues,
        type: "line",
        smooth: true,
        symbolSize: 24,
        lineStyle: {
          width: 5,
        },
      },
      {
        name: "二氧化氮",
        // data: [
        //   53, 88, 10, 67, 92, 31, 74, 46, 20, 37, 85, 16, 63, 70, 41, 99, 25,
        //   77, 82, 13, 68, 49, 55, 7, 39,
        // ],
        data: values.nitrogenDioxideValues,
        type: "line",
        smooth: true,
        symbolSize: 24,
        lineStyle: {
          width: 5,
        },
      },
      {
        name: "一氧化氮",
        // data: [
        //   37, 19, 85, 62, 28, 91, 43, 76, 14, 68, 33, 52, 71, 26, 97, 49, 82,
        //   17, 66, 30, 78, 55, 23, 47,
        // ],
        data: values.sulfurMonoxideValues,
        type: "line",
        smooth: true,
        symbolSize: 24,
        lineStyle: {
          width: 5,
        },
      },
      {
        name: "二氧化硫",
        // data: [
        //   6, 30, 91, 77, 28, 51, 42, 83, 16, 65, 35, 72, 18, 96, 47, 79, 100,
        //   23, 80, 44, 62, 59, 13, 86,
        // ],
        data: values.sulfurDioxideValues,
        type: "line",
        smooth: true,
        symbolSize: 24,
        lineStyle: {
          width: 5,
        },
      },
      {
        name: "硫化氢",
        // data: [
        //   13, 27, 39, 51, 62, 73, 84, 95, 10, 20, 30, 40, 50, 60, 70, 80, 90,
        //   100, 11, 21, 31, 41, 51,
        // ],
        data: values.hydrogenSulfideValues,
        type: "line",
        smooth: true,
        symbolSize: 24,
        lineStyle: {
          width: 5,
        },
      },
    ],
  };
  myEcharts.setOption(option, true);
  //图表大小自适应窗口大小变化
  window.onresize = () => {
    myEcharts.resize();
  };
};
</script>

<style lang="scss" scoped>
#bad-gas-info {
  margin-top:40px;
  cursor: pointer;
  //position: absolute;
  width: 824px;
  min-height: 300px;
  //height: 621px;
  //top: 1441px;
  //right: 72px;
  background-image: url(../../../assets/images/badGasInfo/bg.png);
  padding: 22px 17px 25px 50px;
  .title {
    font-size: 38px;
    font-weight: 800;
    color: #38cafb;
    line-height: 45px;
    //margin: 22px 0px 0px 62px;
  }

  .info-list {
    width: 100%;
    //height: calc(621px - 45px - 22px);
    display: flex;
    flex-wrap: wrap;
    justify-content: space-around;
    padding: 16px 0 0 10px;
  }
}
</style>
